X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0a67eeac3def703ca733305d107088ec01c8cbc2..a84ece11fffdde5d1bbd254ba58ac3cee79c2e77:/docs/latex/wx/locale.tex

diff --git a/docs/latex/wx/locale.tex b/docs/latex/wx/locale.tex
index 121ef3feb5..1450bffe11 100644
--- a/docs/latex/wx/locale.tex
+++ b/docs/latex/wx/locale.tex
@@ -513,10 +513,10 @@ language (see \helpref{GetSystemLanguage}{wxlocalegetsystemlanguage}).}
 for the given locale containing the translations of standard wxWindows messages
 automatically.}
 \twocolitem{\windowstyle{wxLOCALE\_CONV\_ENCODING}}{Automatically convert message
-catalogs to platform's native encoding. Note that it will do only basic 
+catalogs to platform's default encoding. Note that it will do only basic 
 conversion between well-known pair like iso8859-1 and windows-1252 or
 iso8859-2 and windows-1250. See \helpref{Writing non-English applications}{nonenglishoverview} for detailed
-description of this behaviour.}
+description of this behaviour. Note that this flag is meaningless in Unicode build.}
 \end{twocollist}
 }
 
