X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0a67eeac3def703ca733305d107088ec01c8cbc2..93c4157c6cf8603eaba7ebbbc3b1e7bd303d8241:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 976d90ddc7..72ca80f542 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -22,7 +22,7 @@ be variable length according to the size of the window.
 
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{\windowstyle{wxSB\_SIZEGRIP}}{On Windows 95, displays a gripper at right-hand side of
+\twocolitem{\windowstyle{wxST\_SIZEGRIP}}{On Windows 95, displays a gripper at right-hand side of
 the status bar.}
 \end{twocollist}
 
