X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0a67eeac3def703ca733305d107088ec01c8cbc2..146ba0feacf1222ec8a45dfd69dae77b063bf2cf:/docs/latex/wx/print.tex

diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index b498836b50..cc4df2a635 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -134,6 +134,14 @@ wxPRINT_QUALITY_DRAFT
 On input you should pass one of these identifiers, but on return you may get back a positive integer
 indicating the current resolution setting.
 
+\membersection{wxPrintData::Ok}\label{wxprintdataok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns TRUE if the print data is valid for using in print dialogs.
+This can return FALSE on Windows if the current printer is not set, for example.
+On all other platforms, it returns TRUE.
+
 \membersection{wxPrintData::SetCollate}\label{wxprintdatasetcollate}
 
 \func{void}{SetCollate}{\param{bool }{flag}}
@@ -338,6 +346,14 @@ When this function has been called, the ownership of the device context
 is transferred to the application, so it must then be deleted
 explicitly.
 
+\membersection{wxPrintDialog::Ok}\label{wxprintdialogok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns TRUE if the print data associated with the dialog is valid.
+This can return FALSE on Windows if the current printer is not set, for example.
+On all other platforms, it returns TRUE.
+
 \membersection{wxPrintDialog::ShowModal}\label{wxprintdialogshowmodal}
 
 \func{int}{ShowModal}{\void}
@@ -470,6 +486,14 @@ a concept specific to the application).
 
 Returns the {\it to} page number, as entered by the user.
 
+\membersection{wxPrintDialogData::Ok}\label{wxprintdialogdataok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns TRUE if the print data is valid for using in print dialogs.
+This can return FALSE on Windows if the current printer is not set, for example.
+On all other platforms, it returns TRUE.
+
 \membersection{wxPrintDialogData::SetCollate}\label{wxprintdialogdatasetcollate}
 
 \func{void}{SetCollate}{\param{bool }{flag}}
@@ -729,7 +753,8 @@ wxPrintPreview object to initiate printing or previewing.
 
 \func{}{wxPrintout}{\param{const wxString\& }{title = "Printout"}}
 
-Constructor. Pass an optional title argument (currently unused).
+Constructor. Pass an optional title argument - the curent filename would be a good idea. This will appear in the printing list
+(at least in MSW)
 
 \membersection{wxPrintout::\destruct{wxPrintout}}
 
@@ -814,6 +839,12 @@ Dividing the printer PPI by the screen PPI can give a suitable scaling
 factor for drawing text onto the printer. Remember to multiply
 this by a scaling factor to take the preview DC size into account.
 
+\membersection{wxPrintout::GetTitle}\label{wxprintoutgettitle}
+
+\func{wxString}{GetTitle}{\void}
+
+Returns the title of the printout
+
 \pythonnote{This method returns the output-only parameters as a tuple.}
 
 \perlnote{In wxPerl this method takes no arguments and returns a
