X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/09914df7b85fe17845223b291ab65925dceba6f2..d45d30c8682f858321600e2958167d7ef54ebeb5:/docs/latex/wx/tlog.tex

diff --git a/docs/latex/wx/tlog.tex b/docs/latex/wx/tlog.tex
index 0cdc287607..4109e8c490 100644
--- a/docs/latex/wx/tlog.tex
+++ b/docs/latex/wx/tlog.tex
@@ -1,10 +1,7 @@
 \section{Log classes overview}\label{wxlogoverview}
 
-Classes: \helpref{wxLog}{wxlog}\\
-\helpref{wxLogStderr}{wxlogstderr},\\
-\helpref{wxLogOstream}{wxlogostream}, \helpref{wxLogTextCtrl}{wxlogtextctrl},\\
-\helpref{wxLogWindow}{wxlogwindow}, \helpref{wxLogGui}{wxloggui},\\
-\helpref{wxLogNull}{wxlognull}
+Classes: \helpref{wxLog}{wxlog}, wxLogStderr,
+wxLogOstream, wxLogTextCtrl, wxLogWindow, wxLogGui, wxLogNull
 
 This is a general overview of logging classes provided by wxWindows. The word
 logging here has a broad sense, including all of the program output, not only
@@ -47,6 +44,9 @@ first argument.
 \item{\bf wxLogDebug} is {\bf the} right function for debug output. It only
 does anything at all in the debug mode (when the preprocessor symbol
 \_\_WXDEBUG\_\_ is defined) and expands to nothing in release mode (otherwise).
+{\bf Tip:} under Windows, you must either run the program under debugger or
+use a 3rd party program such as \urlref{DbgView}{http://www.sysinternals.com} 
+to actually see the debug output.
 \item{\bf wxLogTrace} as {\bf wxLogDebug} only does something in debug
 build. The reason for making it a separate function from it is that usually
 there are a lot of trace messages, so it might make sense to separate them
