X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/08f1d4387331d652b8297e6a4aef782b921bad5e..e9f4f51d06f536fadacb1796fa124728f50674d2:/docs/latex/wx/settings.tex

diff --git a/docs/latex/wx/settings.tex b/docs/latex/wx/settings.tex
index 378339157b..135bc915e8 100644
--- a/docs/latex/wx/settings.tex
+++ b/docs/latex/wx/settings.tex
@@ -99,7 +99,8 @@ standalone function named {\tt wxSystemSettings\_GetFont}}
 
 \func{static int}{GetMetric}{\param{wxSystemMetric}{ index}}
 
-Returns a system metric.
+Returns the value of a system metric, or -1 if the metric is not
+supported on the current platform.
 
 {\it index} can be one of:
 
