X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/08f1d4387331d652b8297e6a4aef782b921bad5e..d441742626a54f7dd10888ebac5abcc0e55f9234:/docs/latex/wx/scrolwin.tex

diff --git a/docs/latex/wx/scrolwin.tex b/docs/latex/wx/scrolwin.tex
index 96106f3ae0..23c1ec00cd 100644
--- a/docs/latex/wx/scrolwin.tex
+++ b/docs/latex/wx/scrolwin.tex
@@ -19,7 +19,7 @@ calling either \helpref{wxWindow::SetVirtualSize}{wxwindowsetvirtualsize},
 or \helpref{wxWindow::FitInside}{wxwindowfitinside}, and setting the
 scrolling increments for it by calling 
 \helpref{wxScrolledWindow::SetScrollRate}{wxscrolledwindowsetscrollrate}.
-Scrolling in some orientation is enabled by setting a non zero increment
+Scrolling in some orientation is enabled by setting a non-zero increment
 for it.
 
 The most automatic and newest way is to simply let sizers determine the
@@ -372,7 +372,7 @@ yourself.
 
 \membersection{wxScrolledWindow::PrepareDC}\label{wxscrolledwindowpreparedc}
 
-\func{void}{DoPrepareDC}{\param{wxDC\& }{dc}}
+\func{void}{PrepareDC}{\param{wxDC\& }{dc}}
 
 This function is for backwards compatibility only and simply calls 
 \helpref{DoPrepareDC}{wxscrolledwindowdopreparedc} now. Notice that it is 
