X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/08f1d4387331d652b8297e6a4aef782b921bad5e..78603ad208c39cfd20b9e39fb760851148120407:/docs/latex/wx/settings.tex

diff --git a/docs/latex/wx/settings.tex b/docs/latex/wx/settings.tex
index 378339157b..f030a46b6b 100644
--- a/docs/latex/wx/settings.tex
+++ b/docs/latex/wx/settings.tex
@@ -99,7 +99,8 @@ standalone function named {\tt wxSystemSettings\_GetFont}}
 
 \func{static int}{GetMetric}{\param{wxSystemMetric}{ index}}
 
-Returns a system metric.
+Returns the value of a system metric, or -1 if the metric is not
+supported on the current platform.
 
 {\it index} can be one of:
 
@@ -154,3 +155,18 @@ where it would otherwise present the information only in audible form; zero othe
 \pythonnote{This static method is implemented in Python as a
 standalone function named {\tt wxSystemSettings\_GetMetric}}
 
+\membersection{wxSystemSettings::GetScreenType}\label{wxsystemsettingsgetscreentype}
+
+\func{static wxSystemScreenType}{GetScreenType}{\void}
+
+Returns the screen type. The return value is one of:
+
+\twocolwidtha{7cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{{\bf wxSYS_SCREEN\_NONE}}{Undefined screen type}
+\twocolitem{{\bf wxSYS_SCREEN\_TINY}}{Tiny screen, less than 320x240}
+\twocolitem{{\bf wxSYS_SCREEN\_PDA}}{PDA screen, 320x240 or more but less than 640x480}
+\twocolitem{{\bf wxSYS_SCREEN\_SMALL}}{Small screen, 640x480 or more but less than 800x600}
+\twocolitem{{\bf wxSYS_SCREEN\_DESKTOP}}{Desktop screen, 800x600 or more}
+\end{twocollist}
+
