X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/08890e275cae4fa8c5028df5d2b04bb4b0c07525..fc715b5088d317ad09cad84f0d9d375bfac055fd:/docs/latex/wx/strmmem.tex

diff --git a/docs/latex/wx/strmmem.tex b/docs/latex/wx/strmmem.tex
index 64f28a1e5f..c2b85338cb 100644
--- a/docs/latex/wx/strmmem.tex
+++ b/docs/latex/wx/strmmem.tex
@@ -33,6 +33,16 @@ buffer, i.e. the buffer will not be deleted in its destructor.
 Creates a new read-only memory stream, initializing it with the
 data from the given output stream \arg{stream}.
 
+\func{}{wxMemoryInputStream}{\param{wxInputStream\&}{ stream}, \param{wxFileOffset}{ len = wxInvalidOffset}}
+
+Creates a new read-only memory stream, initializing it with the
+data from the given input stream \arg{stream}.
+
+The \arg{len} argument specifies the amount of data to read from
+the \arg{stream}. Setting it to {\it wxInvalidOffset} means that
+the \arg{stream} is to be read entirely (i.e. till the EOF is reached).
+
+
 \membersection{wxMemoryInputStream::\destruct{wxMemoryInputStream}}\label{wxmemoryinputstreamdtor}
 
 \func{}{\destruct{wxMemoryInputStream}}{\void}
