X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/08890e275cae4fa8c5028df5d2b04bb4b0c07525..c699b4583b6047191ac326728654c6fe8920aa7b:/docs/latex/wx/filetype.tex

diff --git a/docs/latex/wx/filetype.tex b/docs/latex/wx/filetype.tex
index 80b7e85cc4..58cc65b403 100644
--- a/docs/latex/wx/filetype.tex
+++ b/docs/latex/wx/filetype.tex
@@ -37,6 +37,10 @@ None
 
 <wx/mimetype.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxMimeTypesManager}{wxmimetypesmanager}
@@ -208,7 +212,7 @@ retrieved from \helpref{MessageParameters}{wxfiletypemessageparameters} class.
 
 This function is primarily intended for GetOpenCommand and GetPrintCommand
 usage but may be also used by the application directly if, for example, you want
-to use some non default command to open the file.
+to use some non-default command to open the file.
 
 The function replaces all occurrences of
 
