X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/08890e275cae4fa8c5028df5d2b04bb4b0c07525..a43ec16b16cf61894294f071011ec984d8a3d673:/docs/latex/wx/filetype.tex

diff --git a/docs/latex/wx/filetype.tex b/docs/latex/wx/filetype.tex
index 80b7e85cc4..c90d97cfad 100644
--- a/docs/latex/wx/filetype.tex
+++ b/docs/latex/wx/filetype.tex
@@ -208,7 +208,7 @@ retrieved from \helpref{MessageParameters}{wxfiletypemessageparameters} class.
 
 This function is primarily intended for GetOpenCommand and GetPrintCommand
 usage but may be also used by the application directly if, for example, you want
-to use some non default command to open the file.
+to use some non-default command to open the file.
 
 The function replaces all occurrences of
 
