X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/08890e275cae4fa8c5028df5d2b04bb4b0c07525..30bbf68d3aa0ad475b25c69e04963ec700e589b6:/docs/latex/wx/dynlib.tex?ds=sidebyside

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index bdb6710a25..6c64a245ea 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -91,14 +91,6 @@ the library any longer in its destructor but it is now the callers
 responsibility to do this using \helpref{Unload}{wxdynamiclibraryunload}.
 
 
-\membersection{wxDynamicLibrary::GetProgramHandle}\label{wxdynamiclibrarygetprogramhandle}
-
-\func{static wxDllType}{GetProgramHandle}{\void}
-
-Return a valid handle for the main program itself or \texttt{NULL} if symbols
-from the main program can't be loaded on this platform.
-
-
 \membersection{wxDynamicLibrary::GetSymbol}\label{wxdynamiclibrarygetsymbol}
 
 \constfunc{void *}{GetSymbol}{\param{const wxString\& }{name}}
