X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/08890e275cae4fa8c5028df5d2b04bb4b0c07525..19cf1ef3a7077dd99a90f141847b8a9b67b318c9:/docs/latex/wx/dynlib.tex

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index bdb6710a25..8c15876b0c 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -16,12 +16,6 @@ wxDynamicLibrary is a class representing dynamically loadable library
 this class to load a library and don't worry about unloading it -- it will be
 done in the objects destructor automatically.
 
-% deprecated now...
-%
-%\wxheading{See also}
-%
-%\helpref{wxDllLoader}{wxdllloader}
-
 \wxheading{Derived from}
 
 No base class.
@@ -30,6 +24,10 @@ No base class.
 
 <wx/dynlib.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 (only available if \texttt{wxUSE\_DYNLIB\_CLASS} is set to $1$)
 
 \latexignore{\rtfignore{\wxheading{Members}}}
@@ -91,14 +89,6 @@ the library any longer in its destructor but it is now the callers
 responsibility to do this using \helpref{Unload}{wxdynamiclibraryunload}.
 
 
-\membersection{wxDynamicLibrary::GetProgramHandle}\label{wxdynamiclibrarygetprogramhandle}
-
-\func{static wxDllType}{GetProgramHandle}{\void}
-
-Return a valid handle for the main program itself or \texttt{NULL} if symbols
-from the main program can't be loaded on this platform.
-
-
 \membersection{wxDynamicLibrary::GetSymbol}\label{wxdynamiclibrarygetsymbol}
 
 \constfunc{void *}{GetSymbol}{\param{const wxString\& }{name}}
@@ -214,6 +204,10 @@ No base class.
 
 <wx/dynlib.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 (only available if \texttt{wxUSE\_DYNLIB\_CLASS} is set to $1$)
 
 \latexignore{\rtfignore{\wxheading{Members}}}
