X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0836334e9fce54fc370314f9d27a513cda9291fa..2712e31795ee7ab4de62189b440d702f3f849c0d:/docs/latex/wx/gauge.tex

diff --git a/docs/latex/wx/gauge.tex b/docs/latex/wx/gauge.tex
index a887f64691..ddef4738db 100644
--- a/docs/latex/wx/gauge.tex
+++ b/docs/latex/wx/gauge.tex
@@ -27,6 +27,10 @@ There are no user commands for the gauge.
 
 <wx/gauge.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
