X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/06e317a336fd52a123626595db192eeeb7408468..6774a5d35508ab4fff8ecacf30b29a07cf69cb78:/docs/latex/wx/wxstring.tex

diff --git a/docs/latex/wx/wxstring.tex b/docs/latex/wx/wxstring.tex
index 536e2abfec..0a4ff10b73 100644
--- a/docs/latex/wx/wxstring.tex
+++ b/docs/latex/wx/wxstring.tex
@@ -16,6 +16,11 @@ method ({\tt length()} in this case, always the lowercase version) should be
 used as it will ensure smoother transition to {\tt std::string} when wxWidgets
 starts using it instead of wxString.
 
+Also please note that in this manual \texttt{char} is sometimes used instead of 
+\texttt{wxChar} because it hasn't been fully updated yet. Please substitute as
+necessary and refer to the sources in case of a doubt.
+
+
 \wxheading{Derived from}
 
 None
@@ -909,7 +914,7 @@ Same as Truncate. Removes the portion from {\it pos} to the end of the string.
 
 \func{wxString\&}{Remove}{\param{size\_t}{ pos}, \param{size\_t}{ len}}
 
-Removes the {\it len} characters from the string, starting at {\it pos}.
+Removes {\it len} characters from the string, starting at {\it pos}.
 
 \membersection{wxString::RemoveLast}\label{wxstringremovelast}
 
@@ -1257,7 +1262,7 @@ buffer (which must be writable, of course) you might call it like this:
 \end{verbatim}
 
 Note that the exact usage of this depends on whether on not wxUSE\_STL is enabled.  If
-wxUSE\_STL is enabled, wxStringBuffer creates a seperate empty character buffer, and
+wxUSE\_STL is enabled, wxStringBuffer creates a separate empty character buffer, and
 if wxUSE\_STL is disabled, it uses GetWriteBuf() from wxString, keeping the same buffer
 wxString uses intact.  In other words, relying on wxStringBuffer containing the old 
 wxString data is probably not a good idea if you want to build your program in both
@@ -1322,7 +1327,7 @@ of the string, you might call it like this:
 \end{verbatim}
 
 Note that the exact usage of this depends on whether on not wxUSE\_STL is enabled.  If
-wxUSE\_STL is enabled, wxStringBuffer creates a seperate empty character buffer, and
+wxUSE\_STL is enabled, wxStringBuffer creates a separate empty character buffer, and
 if wxUSE\_STL is disabled, it uses GetWriteBuf() from wxString, keeping the same buffer
 wxString uses intact.  In other words, relying on wxStringBuffer containing the old 
 wxString data is probably not a good idea if you want to build your program in both
