X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/051443d48135d511ea50d103ca4a3a699e51fe90..c3627a004d0333ec7bfc88e2a397d7d7f9752ea9:/docs/latex/wx/strtotxt.tex

diff --git a/docs/latex/wx/strtotxt.tex b/docs/latex/wx/strtotxt.tex
index c370668e54..9663387cd8 100644
--- a/docs/latex/wx/strtotxt.tex
+++ b/docs/latex/wx/strtotxt.tex
@@ -6,7 +6,7 @@
 %% Created:     19.10.01
 %% RCS-ID:      $Id$
 %% Copyright:   (c) 2001 Vadim Zeitlin <vadim@wxwindows.org>
-%% License:     wxWindows license
+%% License:     wxWidgets license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxStreamToTextRedirector}}\label{wxstreamtotextredirector}
@@ -66,7 +66,7 @@ the default parameter value to the text control {\it text}.
 
 \docparam{ostr}{The C++ stream to redirect, {\it cout} is used if it is NULL}
 
-\membersection{wxStreamToTextRedirector::\destruct{wxStreamToTextRedirector}}
+\membersection{wxStreamToTextRedirector::\destruct{wxStreamToTextRedirector}}\label{wxstreamtotextredirectordtor}
 
 \func{}{\destruct{wxStreamToTextRedirector}}{\void}
 
