X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/051443d48135d511ea50d103ca4a3a699e51fe90..242019eef3fdcdb12b5310da67af3ef6d15e0f58:/docs/latex/wx/strtotxt.tex

diff --git a/docs/latex/wx/strtotxt.tex b/docs/latex/wx/strtotxt.tex
index c370668e54..b133a26071 100644
--- a/docs/latex/wx/strtotxt.tex
+++ b/docs/latex/wx/strtotxt.tex
@@ -34,7 +34,7 @@ Example of usage:
     cout << "Hello, text!" << endl;
   }
 
-  // this goes soemwhere else, presumably to stdout
+  // this goes somewhere else, presumably to stdout
   cout << "Hello, console!" << endl;
 \end{verbatim}
 }%
@@ -47,6 +47,10 @@ No base class
 
 <wx/textctrl.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxTextCtrl}{wxtextctrl}
@@ -62,11 +66,11 @@ the default parameter value to the text control {\it text}.
 
 \wxheading{Parameters}
 
-\docparam{text}{The text control to append output too, must be non NULL}
+\docparam{text}{The text control to append output too, must be non-NULL}
 
 \docparam{ostr}{The C++ stream to redirect, {\it cout} is used if it is NULL}
 
-\membersection{wxStreamToTextRedirector::\destruct{wxStreamToTextRedirector}}
+\membersection{wxStreamToTextRedirector::\destruct{wxStreamToTextRedirector}}\label{wxstreamtotextredirectordtor}
 
 \func{}{\destruct{wxStreamToTextRedirector}}{\void}
 
