X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/051443d48135d511ea50d103ca4a3a699e51fe90..04905cca8701071bf790e00229bf95f6a07ad3b1:/docs/latex/wx/strtotxt.tex?ds=sidebyside

diff --git a/docs/latex/wx/strtotxt.tex b/docs/latex/wx/strtotxt.tex
index c370668e54..8b0e7de771 100644
--- a/docs/latex/wx/strtotxt.tex
+++ b/docs/latex/wx/strtotxt.tex
@@ -34,7 +34,7 @@ Example of usage:
     cout << "Hello, text!" << endl;
   }
 
-  // this goes soemwhere else, presumably to stdout
+  // this goes somewhere else, presumably to stdout
   cout << "Hello, console!" << endl;
 \end{verbatim}
 }%
@@ -66,7 +66,7 @@ the default parameter value to the text control {\it text}.
 
 \docparam{ostr}{The C++ stream to redirect, {\it cout} is used if it is NULL}
 
-\membersection{wxStreamToTextRedirector::\destruct{wxStreamToTextRedirector}}
+\membersection{wxStreamToTextRedirector::\destruct{wxStreamToTextRedirector}}\label{wxstreamtotextredirectordtor}
 
 \func{}{\destruct{wxStreamToTextRedirector}}{\void}
 
