X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/04af2f5ce39da0adc94f0786a26c80fd1ea8a685..e31f4da5f0e888e3bae947061be02a427c570372:/docs/latex/wx/config.tex?ds=sidebyside

diff --git a/docs/latex/wx/config.tex b/docs/latex/wx/config.tex
index d944febb1d..4653313e39 100644
--- a/docs/latex/wx/config.tex
+++ b/docs/latex/wx/config.tex
@@ -23,7 +23,7 @@ so please have a \helpref{look at them.}{wxconfigstaticfunctions}
 
 \wxheading{Derived from}
 
-No base class
+\helpref{wxObject}{wxobject}
 
 \wxheading{Include files}
 
@@ -353,7 +353,7 @@ The following functions control this option:
  \param{const wxString\& }{localFilename = wxEmptyString},
  \param{const wxString\& }{globalFilename = wxEmptyString},
  \param{long}{ style = 0},
- \param{wxMBConv\&}{ conv = wxConvUTF8}}
+ \param{const wxMBConv\&}{ conv = wxConvAuto()}}
 
 This is the default and only constructor of the wxConfigBase class, and
 derived classes.
@@ -378,7 +378,11 @@ this is not present, but required, the application name will be used instead.}
 \docparam{style}{Can be one of wxCONFIG\_USE\_LOCAL\_FILE and
 wxCONFIG\_USE\_GLOBAL\_FILE. The style interpretation depends on the config
 class and is ignored by some implementations. For wxFileConfig, these styles
-determine whether a local or global config file is created or used. If the
+determine whether a local or global config file is created or used: if
+wxCONFIG\_USE\_GLOBAL\_FILE is used, then settings are read from the global
+config file and if wxCONFIG\_USE\_LOCAL\_FILE is used, settings are read from
+and written to local config file (if they are both set, global file is read
+first, then local file, overwriting global settings). If the
 flag is present but the parameter is empty, the parameter will be set to a
 default. If the parameter is present but the style flag not, the relevant flag
 will be added to the style. For wxRegConfig, thie GLOBAL flag refers to HKLM
@@ -393,8 +397,8 @@ However, this path may be also used as user data directory
 (see \helpref{wxStandardPaths::GetUserDataDir}{wxstandardpathsgetuserdatadir}) if
 the application has several data files. In this case wxCONFIG\_USE\_SUBDIR
 flag, which changes the default local configuration file to \tt{~/.appname/appname}
-should be used. Notice that this flag is ignored on non-Unix system, including
-VMS, or if a non-default \textit{localFilename} is provided. \newsince{2.8.2}
+should be used. Notice that this flag is ignored if \textit{localFilename} is
+provided. \newsince{2.8.2}
 
 For wxFileConfig, you can also add wxCONFIG\_USE\_NO\_ESCAPE\_CHARACTERS which
 will turn off character escaping for the values of entries stored in the config
