X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/04af2f5ce39da0adc94f0786a26c80fd1ea8a685..d2b23b67301bd2d286366d4326a21da3132558fa:/docs/latex/wx/config.tex

diff --git a/docs/latex/wx/config.tex b/docs/latex/wx/config.tex
index d944febb1d..d7f6d8efcd 100644
--- a/docs/latex/wx/config.tex
+++ b/docs/latex/wx/config.tex
@@ -23,7 +23,7 @@ so please have a \helpref{look at them.}{wxconfigstaticfunctions}
 
 \wxheading{Derived from}
 
-No base class
+\helpref{wxObject}{wxobject}
 
 \wxheading{Include files}
 
@@ -393,8 +393,8 @@ However, this path may be also used as user data directory
 (see \helpref{wxStandardPaths::GetUserDataDir}{wxstandardpathsgetuserdatadir}) if
 the application has several data files. In this case wxCONFIG\_USE\_SUBDIR
 flag, which changes the default local configuration file to \tt{~/.appname/appname}
-should be used. Notice that this flag is ignored on non-Unix system, including
-VMS, or if a non-default \textit{localFilename} is provided. \newsince{2.8.2}
+should be used. Notice that this flag is ignored if \textit{localFilename} is
+provided. \newsince{2.8.2}
 
 For wxFileConfig, you can also add wxCONFIG\_USE\_NO\_ESCAPE\_CHARACTERS which
 will turn off character escaping for the values of entries stored in the config
