X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0497e17283d5ec84df3d1b24e74b79d1488f5637..8b0f8432d72fc44aa7247ab1c19c04103323feea:/docs/latex/wx/accessible.tex

diff --git a/docs/latex/wx/accessible.tex b/docs/latex/wx/accessible.tex
index fb426d7d01..29231e29cc 100644
--- a/docs/latex/wx/accessible.tex
+++ b/docs/latex/wx/accessible.tex
@@ -48,8 +48,7 @@ symbol is set to 1.
 Functions return a wxAccStatus error code, which
 may be one of the following:
 
-{\small%
-\begin{verbatim}
+{\small \begin{verbatim}
 typedef enum
 {
     wxACC\_FAIL,             // The function failed
@@ -63,8 +62,7 @@ typedef enum
 Directions of navigation are represented by
 the following:
 
-{\small%
-\begin{verbatim}
+{\small \begin{verbatim}
 typedef enum
 {
     wxNAVDIR\_DOWN,
@@ -81,8 +79,7 @@ typedef enum
 The role of a user interface element is represented
 by the following type:
 
-{\small%
-\begin{verbatim}
+{\small \begin{verbatim}
 typedef enum {  
     wxROLE\_NONE,
     wxROLE\_SYSTEM\_ALERT,
@@ -151,8 +148,7 @@ typedef enum {
 
 Objects are represented by the following type:
 
-{\small%
-\begin{verbatim}
+{\small \begin{verbatim}
 typedef enum {
     wxOBJID\_WINDOW =    0x00000000,
     wxOBJID\_SYSMENU =   0xFFFFFFFF,
@@ -172,8 +168,7 @@ typedef enum {
 Selection actions are identified by
 this type:
 
-{\small%
-\begin{verbatim}
+{\small \begin{verbatim}
 typedef enum
 {
     wxACC\_SEL\_NONE            = 0,
@@ -187,8 +182,7 @@ typedef enum
 
 States are represented by the following:
 
-{\small%
-\begin{verbatim}
+{\small \begin{verbatim}
 #define wxACC\_STATE\_SYSTEM\_ALERT\_HIGH       0x00000001
 #define wxACC\_STATE\_SYSTEM\_ALERT\_MEDIUM     0x00000002
 #define wxACC\_STATE\_SYSTEM\_ALERT\_LOW        0x00000004
@@ -220,8 +214,7 @@ States are represented by the following:
 Event identifiers that can be sent via \helpref{wxAccessible::NotifyEvent}{wxaccessiblenotifyevent} are
 as follows:
 
-{\small%
-\begin{verbatim}
+{\small \begin{verbatim}
 #define wxACC\_EVENT\_SYSTEM\_SOUND              0x0001
 #define wxACC\_EVENT\_SYSTEM\_ALERT              0x0002
 #define wxACC\_EVENT\_SYSTEM\_FOREGROUND         0x0003
