X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/03d776096f61ec2a234bf0ede5764fb2e7cbf496..90b903c26306d88d3920589125ea1a03664e1b22:/docs/latex/wx/notebook.tex?ds=sidebyside

diff --git a/docs/latex/wx/notebook.tex b/docs/latex/wx/notebook.tex
index ed7a112c1f..ea9dedcc48 100644
--- a/docs/latex/wx/notebook.tex
+++ b/docs/latex/wx/notebook.tex
@@ -276,8 +276,6 @@ Returns the index of the tab at the specified position or {\tt wxNOT\_FOUND}
 if none. If {\it flags} parameter is non {\tt NULL}, the position of the point
 inside the tab is returned as well.
 
-{\bf NB: } This method is currently only implemented under wxMSW and wxUniv.
-
 \wxheading{Parameters}
 
 \docparam{pt}{Specifies the point for the hit test.}
