X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/027aa6fa77e5b4643d2296f63d6911beb496c5bc..82ce8b17f728fe648f431b379ba23721e0ebc06d:/docs/latex/wx/wizard.tex?ds=sidebyside

diff --git a/docs/latex/wx/wizard.tex b/docs/latex/wx/wizard.tex
index e222656bba..85ffbb41da 100644
--- a/docs/latex/wx/wizard.tex
+++ b/docs/latex/wx/wizard.tex
@@ -181,7 +181,7 @@ by repeatedly applying
 any page inserted into the sizer. Third,
 the minimal size specified using \helpref{SetPageSize}{wxwizardsetpagesize} and 
 \helpref{FitToPage}{wxwizardfittopage}. Fourth, the total wizard height may
-be increased to accomodate the bitmap height. Fifth and finally, wizards are
+be increased to accommodate the bitmap height. Fifth and finally, wizards are
 never smaller than some built-in minimal size to avoid wizards that are too small.
 
 The caller can use \helpref{wxSizer::SetMinSize}{wxsizersetminsize} to enlarge it
