X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/027aa6fa77e5b4643d2296f63d6911beb496c5bc..65de19d80ac1ee363782eb9d36f9b4d567160f43:/docs/latex/wx/wizard.tex

diff --git a/docs/latex/wx/wizard.tex b/docs/latex/wx/wizard.tex
index e222656bba..c401b8c5c4 100644
--- a/docs/latex/wx/wizard.tex
+++ b/docs/latex/wx/wizard.tex
@@ -6,7 +6,7 @@
 %% Created:     02.04.00
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% License:     wxWidgets license
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxWizard}}\label{wxwizard}
@@ -181,7 +181,7 @@ by repeatedly applying
 any page inserted into the sizer. Third,
 the minimal size specified using \helpref{SetPageSize}{wxwizardsetpagesize} and 
 \helpref{FitToPage}{wxwizardfittopage}. Fourth, the total wizard height may
-be increased to accomodate the bitmap height. Fifth and finally, wizards are
+be increased to accommodate the bitmap height. Fifth and finally, wizards are
 never smaller than some built-in minimal size to avoid wizards that are too small.
 
 The caller can use \helpref{wxSizer::SetMinSize}{wxsizersetminsize} to enlarge it
