X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/01ebf7520366a4cf80975d820794fea394c96d7b..65baafba0e8cd74f2264b7e2f7625ff5bea84864:/docs/latex/wx/timer.tex?ds=sidebyside

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index 88ecf4940b..d5554cd07c 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -53,7 +53,7 @@ Default constructor. If you use it to construct the object and don't call
 Creates a timer and associates it with {\it owner}. Please see 
 \helpref{SetOwner}{wxtimersetowner} for the description of parameters.
 
-\membersection{wxTimer::\destruct{wxTimer}}
+\membersection{wxTimer::\destruct{wxTimer}}\label{wxtimerdtor}
 
 \func{}{\destruct{wxTimer}}{\void}
 
@@ -97,7 +97,7 @@ id equal to {\it id}\/ specified here.
 
 \membersection{wxTimer::Start}\label{wxtimerstart}
 
-\func{bool}{Start}{\param{int}{milliseconds = -1}, \param{bool }{oneShot = {\tt false}}}
+\func{bool}{Start}{\param{int }{milliseconds = -1}, \param{bool }{oneShot = {\tt false}}}
 
 (Re)starts the timer. If {\it milliseconds}\/ parameter is -1 (value by default),
 the previous value is used. Returns {\tt false} if the timer could not be started,
@@ -106,14 +106,14 @@ the previous value is used. Returns {\tt false} if the timer could not be starte
 If {\it oneShot}\/ is {\tt false} (the default), the \helpref{Notify}{wxtimernotify} 
 function will be called repeatedly until the timer is stopped. If {\tt true},
 it will be called only once and the timer will stop automatically. To make your
-code more readable you may also use the following symbolic constants
-\twocolwidtha{5cm}%
+code more readable you may also use the following symbolic constants:
+
+\twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
 \twocolitem{wxTIMER\_CONTINUOUS}{Start a normal, continuously running, timer}
 \twocolitem{wxTIMER\_ONE\_SHOT}{Start a one shot timer}
 \end{twocollist}
 
-
 If the timer was already running, it will be stopped by this method before
 restarting it.
 
