X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/01ebf7520366a4cf80975d820794fea394c96d7b..32485259c1342115488d219776dfebeb3d4d81b1:/docs/latex/wx/timer.tex

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index 88ecf4940b..21edad6b88 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -53,7 +53,7 @@ Default constructor. If you use it to construct the object and don't call
 Creates a timer and associates it with {\it owner}. Please see 
 \helpref{SetOwner}{wxtimersetowner} for the description of parameters.
 
-\membersection{wxTimer::\destruct{wxTimer}}
+\membersection{wxTimer::\destruct{wxTimer}}\label{wxtimerdtor}
 
 \func{}{\destruct{wxTimer}}{\void}
 
@@ -106,14 +106,14 @@ the previous value is used. Returns {\tt false} if the timer could not be starte
 If {\it oneShot}\/ is {\tt false} (the default), the \helpref{Notify}{wxtimernotify} 
 function will be called repeatedly until the timer is stopped. If {\tt true},
 it will be called only once and the timer will stop automatically. To make your
-code more readable you may also use the following symbolic constants
-\twocolwidtha{5cm}%
+code more readable you may also use the following symbolic constants:
+
+\twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
 \twocolitem{wxTIMER\_CONTINUOUS}{Start a normal, continuously running, timer}
 \twocolitem{wxTIMER\_ONE\_SHOT}{Start a one shot timer}
 \end{twocollist}
 
-
 If the timer was already running, it will be stopped by this method before
 restarting it.
 
