X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0133d06b1a1dbb3bebc0ddb8cf2a7aa9d926a936..240889a18cb17f20884c6ce36e52a6dcf589bb08:/docs/latex/wx/frame.tex?ds=sidebyside

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index bb875b6206..d4bd5a33a1 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -276,7 +276,7 @@ Returns a pointer to the toolbar currently associated with the frame (if any).
 
 \func{void}{Iconize}{\param{bool}{ iconize}}
 
-Iconizes or restores the frame. Windows only.
+Iconizes or restores the frame.
 
 \wxheading{Parameters}
 
@@ -300,7 +300,7 @@ Returns TRUE if the frame is in fullscreen mode.
 
 \constfunc{bool}{IsIconized}{\void}
 
-Returns TRUE if the frame is iconized. Windows only.
+Returns TRUE if the frame is iconized.
 
 \membersection{wxFrame::IsMaximized}\label{wxframeismaximized}
 
@@ -594,3 +594,4 @@ This function has not been tested with MDI frames.
 \wxheading{See also}
 
 \helpref{wxFrame::IsFullScreen}{wxframeisfullscreen}
+
