X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0032ddbb32de472a9ed5e96879b1a23d70df023a..86b79b93fbbb0c2e90e6595f7fea0f979b80881c:/docs/latex/wx/frame.tex

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 63ce820394..a16aa28eb4 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -51,8 +51,8 @@ caption. When pressed, Windows will go into a context-sensitive help mode and wx
 a wxEVT\_HELP event if the user clicked on an application window. {\it Note} that this is an extended
 style and must be set by calling \helpref{SetExtraStyle}{wxwindowsetextrastyle} before Create is called (two-step construction).
 You cannot use this style together with wxMAXIMIZE\_BOX or wxMINIMIZE\_BOX, so
-you should use
-{\tt wxDEFAULT\_FRAME\_STYLE \& (wxMINIMIZE\_BOX | wxMAXIMIZE\_BOX)} for the
+you should use\rtfsp
+{\tt wxDEFAULT\_FRAME\_STYLE \& ~ (wxMINIMIZE\_BOX | wxMAXIMIZE\_BOX)} for the
 frames having this style (the dialogs don't have a minimize or a maximize box by
 default)}
 \twocolitem{\windowstyle{wxFRAME\_SHAPED}}{Windows with this style are
@@ -61,7 +61,7 @@ default)}
 
 The default frame style is for normal, resizeable frames. To create a frame
 which can not be resized by user, you may use the following combination of
-styles: {\tt wxDEFAULT\_FRAME\_STYLE \& (wxRESIZE\_BORDER \pipe wxRESIZE\_BOX \pipe wxMAXIMIZE\_BOX)}.
+styles: {\tt wxDEFAULT\_FRAME\_STYLE \& ~ (wxRESIZE\_BORDER \pipe wxRESIZE\_BOX \pipe wxMAXIMIZE\_BOX)}.
 % Note: the space after the tilde is necessary or Tex2RTF complains.
 
 See also \helpref{window styles overview}{windowstyles}.
