X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0032ddbb32de472a9ed5e96879b1a23d70df023a..77d47192a89f7142f93c103760c8cbb824ec961d:/docs/latex/wx/gauge.tex?ds=inline

diff --git a/docs/latex/wx/gauge.tex b/docs/latex/wx/gauge.tex
index d615f8ec88..563bdbbc8e 100644
--- a/docs/latex/wx/gauge.tex
+++ b/docs/latex/wx/gauge.tex
@@ -37,7 +37,7 @@ wxGauge is read-only so generates no events.
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 
-\membersection{wxGauge::wxGauge}\label{wxgaugeconstr}
+\membersection{wxGauge::wxGauge}\label{wxgaugector}
 
 \func{}{wxGauge}{\void}
 
@@ -70,7 +70,7 @@ Constructor, creating and showing a gauge.
 \helpref{wxGauge::Create}{wxgaugecreate}
 
 
-\membersection{wxGauge::\destruct{wxGauge}}
+\membersection{wxGauge::\destruct{wxGauge}}\label{wxgaugedtor}
 
 \func{}{\destruct{wxGauge}}{\void}
 
@@ -83,7 +83,7 @@ Destructor, destroying the gauge.
 \param{int}{ range}, \param{const wxPoint\& }{ pos = wxDefaultPosition}, \param{const wxSize\&}{ size = wxDefaultSize},\rtfsp
 \param{long}{ style = wxGA\_HORIZONTAL}, \param{const wxValidator\& }{validator = wxDefaultValidator}, \param{const wxString\& }{name = ``gauge"}}
 
-Creates the gauge for two-step construction. See \helpref{wxGauge::wxGauge}{wxgaugeconstr}\rtfsp
+Creates the gauge for two-step construction. See \helpref{wxGauge::wxGauge}{wxgaugector}\rtfsp
 for further details.
 
 
