%
% automatically generated by HelpGen from
% ../include/wx/strconv.h at 25/Mar/00 10:20:56
%

\section{\class{wxMBConvUTF7}}\label{wxmbconvutf7}

This class converts between the UTF-7 encoding and Unicode.
It has one predefined instance, {\bf wxConvUTF7}.

{\bf WARNING:} this class is not implemented yet.

\wxheading{Derived from}

\helpref{wxMBConv}{wxmbconv}

\wxheading{Include files}

<wx/strconv.h>

\wxheading{Library}

\helpref{wxBase}{librarieslist}

\wxheading{See also}

\helpref{wxMBConvUTF8}{wxmbconvutf8}, 
\helpref{wxMBConv classes overview}{mbconvclasses}

\latexignore{\rtfignore{\wxheading{Members}}}

\membersection{wxMBConvUTF7::MB2WC}\label{wxmbconvutf7mb2wc}

\constfunc{size\_t}{MB2WC}{\param{wchar\_t* }{buf}, \param{const char* }{psz}, \param{size\_t }{n}}

Converts from UTF-7 encoding to Unicode. Returns the size of the destination buffer.

\membersection{wxMBConvUTF7::WC2MB}\label{wxmbconvutf7wc2mb}

\constfunc{size\_t}{WC2MB}{\param{char* }{buf}, \param{const wchar\_t* }{psz}, \param{size\_t }{n}}

Converts from Unicode to UTF-7 encoding. Returns the size of the destination buffer.

