%
% automatically generated by HelpGen $Revision$ from
% toolwnd.h at 05/Jan/02 22:50:58
%


\section{\class{cbCloseBox}}\label{cbclosebox}


classes specific to wxFrameLayout engine (FOR NOW in here...)

\wxheading{Derived from}

\helpref{cbMiniButton}{cbminibutton}

\wxheading{Data structures}

\latexignore{\rtfignore{\wxheading{Members}}}


\membersection{cbCloseBox::Draw}\label{cbcloseboxdraw}

\func{void}{Draw}{\param{wxDC\& }{dc}}

