<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\section{\class{wxRealFormValidator}}\label{wxrealformvalidator}

\overview{Validator classes}{proplistvalidatorclasses}

This class validates a range of real values for form views. The associated panel item must be a wxText.

\membersection{wxRealFormValidator::wxRealFormValidator}

\func{void}{wxRealFormValidator}{\param{float }{min=0.0}, \param{float }{max=0.0},
 \param{long}{ flags=0}}

Constructor. Assigning zero to minimum and maximum values indicates that there is no range to check.


</pre></body></html>