\section{\class{wxFlexGridSizer}}\label{wxflexgridsizer}

A flex grid sizer is a sizer which lays out its children in a two-dimensional
table with all table fields in one row having the same
height and all fields in one column having the same width, but all
rows or all columns are not necessarily the same height or width as in
the \helpref{wxGridSizer}{wxgridsizer}.

\wxheading{Derived from}

\helpref{wxGridSizer}{wxgridsizer}\\
\helpref{wxSizer}{wxsizer}\\
\helpref{wxObject}{wxobject}

\membersection{wxFlexGridSizer::wxFlexGridSizer}\label{wxflexgridsizerwxflexgridsizer}

\func{}{wxFlexGridSizer}{\param{int }{rows}, \param{int }{cols}, \param{int }{vgap}, \param{int }{hgap}}

\func{}{wxFlexGridSizer}{\param{int }{cols}, \param{int }{vgap = 0}, \param{int }{hgap = 0}}

Constructor for a wxGridSizer. {\it rows} and {\it cols} determine the number of
columns and rows in the sizer - if either of the parameters is zero, it will be
calculated to form the total number of children in the sizer, thus making the
sizer grow dynamically. {\it vgap} and {\it hgap} define extra space between
all children.


\membersection{wxFlexGridSizer::AddGrowableCol}\label{wxflexgridsizeraddgrowablecol}

\func{void}{AddGrowableCol}{\param{size_t }{idx}}

Specifies that column idx (starting from zero) should be grown if
there is extra space available to the sizer.

\membersection{wxFlexGridSizer::AddGrowableRow}\label{wxflexgridsizeraddgrowablerow}

\func{void}{AddGrowableRow}{\param{size_t }{idx}}

Specifies that row idx (starting from zero) should be grown if there
is extra space available to the sizer.

\membersection{wxFlexGridSizer::RemoveGrowableCol}\label{wxflexgridsizerremovegrowablecol}

\func{void}{RemoveGrowableCol}{\param{size_t }{idx}}

Specifies that column idx is no longer growable.

\membersection{wxFlexGridSizer::RemoveGrowableRow}\label{wxflexgridsizerremovegrowablerow}

\func{void}{RemoveGrowableRow}{\param{size_t }{idx}}

Specifies that row idx is no longer growable.

