\section{\class{wxDatabase}}\label{wxdatabase}

Every database object represents an ODBC connection.
The connection may be closed and reopened.

\wxheading{Derived from}

\helpref{wxObject}{wxobject}

\wxheading{Include files}

<wx/odbc.h>

\wxheading{See also}

\overview{wxDatabase overview}{wxdatabaseoverview}, \helpref{wxRecordSet}{wxrecordset}

\latexignore{\rtfignore{\wxheading{Members}}}

\membersection{wxDatabase::wxDatabase}

\func{}{wxDatabase}{\void}

Constructor. The constructor of the first wxDatabase instance of an
application initializes the ODBC manager.

\membersection{wxDatabase::\destruct{wxDatabase}}

\func{}{\destruct{wxDatabase}}{\void}

Destructor. Resets and destroys any associated wxRecordSet instances.

The destructor of the last wxDatabase instance will deinitialize
the ODBC manager.

\membersection{wxDatabase::BeginTrans}

\func{bool}{BeginTrans}{\void}

Not implemented.

\membersection{wxDatabase::Cancel}

\func{void}{Cancel}{\void}

Not implemented.

\membersection{wxDatabase::CanTransact}

\func{bool}{CanTransact}{\void}

Not implemented.


\membersection{wxDatabase::CanUpdate}

\func{bool}{CanUpdate}{\void}

Not implemented.

\membersection{wxDatabase::Close}

\func{bool}{Close}{\void}

Resets the statement handles of any associated wxRecordSet objects,
and disconnects from the current data source.

\membersection{wxDatabase::CommitTrans}

\func{bool}{CommitTrans}{\void}

Commits previous transactions. Not implemented.

\membersection{wxDatabase::ErrorOccured}

\func{bool}{ErrorOccured}{\void}

Returns TRUE if the last action caused an error.

\membersection{wxDatabase::ErrorSnapshot}

\func{void}{ErrorSnapshot}{\param{HSTMT}{ statement = SQL\_NULL\_HSTMT}}

This function will be called whenever an ODBC error occured. It stores the
error related information returned by ODBC. If a statement handle of the
concerning ODBC action is available it should be passed to the function.

\membersection{wxDatabase::GetDatabaseName}

\func{wxString}{GetDatabaseName}{\void}

Returns the name of the database associated with the current connection.

\membersection{wxDatabase::GetDataSource}

\func{wxString}{GetDataSource}{\void}

Returns the name of the connected data source.

\membersection{wxDatabase::GetErrorClass}

\func{wxString}{GetErrorClass}{\void}

Returns the error class of the last error. The error class consists of
five characters where the first two characters contain the class
and the other three characters contain the subclass of the ODBC error.
See ODBC documentation for further details.

\membersection{wxDatabase::GetErrorCode}

\func{wxRETCODE}{GetErrorCode}{\void}

Returns the error code of the last ODBC function call. This will be one of:

\begin{twocollist}\itemsep=0pt
\twocolitem{SQL\_ERROR}{General error.}
\twocolitem{SQL\_INVALID\_HANDLE}{An invalid handle was passed to an ODBC function.}
\twocolitem{SQL\_NEED\_DATA}{ODBC expected some data.}
\twocolitem{SQL\_NO\_DATA\_FOUND}{No data was found by this ODBC call.}
\twocolitem{SQL\_SUCCESS}{The call was successful.}
\twocolitem{SQL\_SUCCESS\_WITH\_INFO}{The call was successful, but further information can be
obtained from the ODBC manager.}
\end{twocollist}

\membersection{wxDatabase::GetErrorMessage}

\func{wxString}{GetErrorMessage}{\void}

Returns the last error message returned by the ODBC manager.

\membersection{wxDatabase::GetErrorNumber}

\func{long}{GetErrorNumber}{\void}

Returns the last native error. A native error is an ODBC driver dependent
error number.

\membersection{wxDatabase::GetHDBC}

\func{HDBC}{GetHDBC}{\void}

Returns the current ODBC database handle.

\membersection{wxDatabase::GetHENV}

\func{HENV}{GetHENV}{\void}

Returns the ODBC environment handle. 

\membersection{wxDatabase::GetInfo}

\func{bool}{GetInfo}{\param{long}{ infoType}, \param{long *}{buf}}

\func{bool}{GetInfo}{\param{long}{ infoType}, \param{const wxString\& }{buf}, \param{int}{ bufSize=-1}}

Returns requested information. The return value is TRUE if successful, FALSE otherwise.

{\it infoType} is an ODBC identifier specifying the type of information to be returned.

{\it buf} is a character or long integer pointer to storage which must be allocated by the
application, and which will contain the information if the function is successful.

{\it bufSize} is the size of the character buffer. A value of -1 indicates that the size
should be computed by the GetInfo function.

\membersection{wxDatabase::GetPassword}

\func{wxString}{GetPassword}{\void}

Returns the password of the current user.

\membersection{wxDatabase::GetUsername}

\func{wxString}{GetUsername}{\void}

Returns the current username.

\membersection{wxDatabase::GetODBCVersionFloat}

\func{float}{GetODBCVersionFloat}{\param{bool}{ implementation=TRUE}}

Returns the version of ODBC in floating point format, e.g. 2.50.

{\it implementation} should be TRUE to get the DLL version, or FALSE to get the
version defined in the {\tt sql.h} header file.

This function can return the value 0.0 if the header version number is not defined (for early
versions of ODBC).

\membersection{wxDatabase::GetODBCVersionString}

\func{wxString}{GetODBCVersionString}{\param{bool}{ implementation=TRUE}}

Returns the version of ODBC in string format, e.g. ``02.50".

{\it implementation} should be TRUE to get the DLL version, or FALSE to get the
version defined in the {\tt sql.h} header file.

This function can return the value ``00.00" if the header version number is not defined (for early
versions of ODBC).

\membersection{wxDatabase::InWaitForDataSource}

\func{bool}{InWaitForDataSource}{\void}

Not implemented.

\membersection{wxDatabase::IsOpen}

\func{bool}{IsOpen}{\void}

Returns TRUE if a connection is open.

\membersection{wxDatabase::Open}\label{wxdatabaseopen}

\func{bool}{Open}{\param{const wxString\& }{datasource}, \param{bool}{ exclusive = FALSE}, \param{bool }{readOnly = TRUE},
 \param{const wxString\& }{username = ``ODBC"}, \param{const wxString\& }{password = ``"}}

Connect to a data source. {\it datasource} contains the name of the ODBC data
source. The parameters exclusive and readOnly are not used.

\membersection{wxDatabase::OnSetOptions}

\func{void}{OnSetOptions}{\param{wxRecordSet *}{recordSet}}

Not implemented.  

\membersection{wxDatabase::OnWaitForDataSource}

\func{void}{OnWaitForDataSource}{\param{bool}{ stillExecuting}}

Not implemented.

\membersection{wxDatabase::RollbackTrans}

\func{bool}{RollbackTrans}{\void}

Sends a rollback to the ODBC driver. Not implemented.

\membersection{wxDatabase::SetDataSource}

\func{void}{SetDataSource}{\param{const wxString\& }{s}}

Sets the name of the data source. Not implemented.

\membersection{wxDatabase::SetLoginTimeout}

\func{void}{SetLoginTimeout}{\param{long}{ seconds}}

Sets the time to wait for an user login. Not implemented.

\membersection{wxDatabase::SetPassword}

\func{void}{SetPassword}{\param{const wxString\& }{s}}

Sets the password of the current user. Not implemented.

\membersection{wxDatabase::SetSynchronousMode}

\func{void}{SetSynchronousMode}{\param{bool }{synchronous}}

Toggles between synchronous and asynchronous mode. Currently only synchronous
mode is supported, so this function has no effect.

\membersection{wxDatabase::SetQueryTimeout}

\func{void}{SetQueryTimeout}{\param{long}{ seconds}}

Sets the time to wait for a response to a query. Not implemented.

\membersection{wxDatabase::SetUsername}

\func{void}{SetUsername}{\param{const wxString\& }{s}}

Sets the name of the current user. Not implemented.


