<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\section{\class{wxGauge}}\label{wxgauge}

A gauge is a horizontal or vertical bar which shows a quantity (often time).
There are no user commands for the gauge.

\wxheading{Derived from}

\helpref{wxControl}{wxcontrol}\\
\helpref{wxWindow}{wxwindow}\\
\helpref{wxEvtHandler}{wxevthandler}\\
\helpref{wxObject}{wxobject}

\wxheading{Include files}

&lt;wx/gauge.h&gt;

\wxheading{Window styles}

\twocolwidtha{5cm}
\begin{twocollist}\itemsep=0pt
\twocolitem{\windowstyle{wxGA\_HORIZONTAL}}{Creates a horizontal gauge.}
\twocolitem{\windowstyle{wxGA\_VERTICAL}}{Creates a vertical gauge.}
\twocolitem{\windowstyle{wxGA\_PROGRESSBAR}}{Under Windows 95, creates a horizontal progress bar.}
\twocolitem{\windowstyle{wxGA\_SMOOTH}}{Under Windows 95, creates smooth progress bar with one pixel wide update step.}
\end{twocollist}

See also \helpref{window styles overview}{windowstyles}.

\wxheading{Event handling}

wxGauge is read-only so generates no events.

\wxheading{See also}

\helpref{wxSlider}{wxslider}, \helpref{wxScrollBar}{wxscrollbar}

\latexignore{\rtfignore{\wxheading{Members}}}

\membersection{wxGauge::wxGauge}\label{wxgaugeconstr}

\func{}{wxGauge}{\void}

Default constructor.

\func{}{wxGauge}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
\param{int}{ range}, \param{const wxPoint\&amp; }{ pos = wxDefaultPosition}, \param{const wxSize\&amp;}{ size = wxDefaultSize},\rtfsp
\param{long}{ style = wxGA\_HORIZONTAL}, \param{const wxValidator\&amp; }{validator = wxDefaultValidator}, \param{const wxString\&amp; }{name = ``gauge"}}

Constructor, creating and showing a gauge.

\wxheading{Parameters}

\docparam{parent}{Window parent.}

\docparam{id}{Window identifier.}

\docparam{range}{Integer range (maximum value) of the gauge.}

\docparam{pos}{Window position.}

\docparam{size}{Window size.}

\docparam{style}{Gauge style. See \helpref{wxGauge}{wxgauge}.}

\docparam{name}{Window name.}

\wxheading{Remarks}

Under Windows 95, there are two different styles of gauge: normal gauge, and progress bar (when
the {\bf wxGA\_PROGRESSBAR} style is used). A progress bar is always horizontal.

\wxheading{See also}

\helpref{wxGauge::Create}{wxgaugecreate}

\membersection{wxGauge::\destruct{wxGauge}}

\func{}{\destruct{wxGauge}}{\void}

Destructor, destroying the gauge.

\membersection{wxGauge::Create}\label{wxgaugecreate}

\func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
\param{int}{ range}, \param{const wxPoint\&amp; }{ pos = wxDefaultPosition}, \param{const wxSize\&amp;}{ size = wxDefaultSize},\rtfsp
\param{long}{ style = wxGA\_HORIZONTAL}, \param{const wxValidator\&amp; }{validator = wxDefaultValidator}, \param{const wxString\&amp; }{name = ``gauge"}}

Creates the gauge for two-step construction. See \helpref{wxGauge::wxGauge}{wxgaugeconstr}\rtfsp
for further details.

\membersection{wxGauge::GetBezelFace}\label{wxgaugegetbezelface}

\constfunc{int}{GetBezelFace}{\void}

Returns the width of the 3D bezel face.

\wxheading{Remarks}

Windows only, not for {\bf wxGA\_PROGRESSBAR}.

\wxheading{See also}

\helpref{wxGauge::SetBezelFace}{wxgaugesetbezelface}

\membersection{wxGauge::GetRange}\label{wxgaugegetrange}

\constfunc{int}{GetRange}{\void}

Returns the maximum position of the gauge.

\wxheading{See also}

\helpref{wxGauge::SetRange}{wxgaugesetrange}

\membersection{wxGauge::GetShadowWidth}\label{wxgaugegetshadowwidth}

\constfunc{int}{GetShadowWidth}{\void}

Returns the 3D shadow margin width.

\wxheading{Remarks}

Windows only, not for {\bf wxGA\_PROGRESSBAR}.

\wxheading{See also}

\helpref{wxGauge::SetShadowWidth}{wxgaugesetshadowwidth}

\membersection{wxGauge::GetValue}\label{wxgaugegetvalue}

\constfunc{int}{GetValue}{\void}

Returns the current position of the gauge.

\wxheading{See also}

\helpref{wxGauge::SetValue}{wxgaugesetvalue}

\membersection{wxGauge::SetBezelFace}\label{wxgaugesetbezelface}

\func{void}{SetBezelFace}{\param{int }{width}}

Sets the 3D bezel face width.

\wxheading{Remarks}

Windows only, not for {\bf wxGA\_PROGRESSBAR}.

\wxheading{See also}

\helpref{wxGauge::GetBezelFace}{wxgaugegetbezelface}

\membersection{wxGauge::SetRange}\label{wxgaugesetrange}

\func{void}{SetRange}{\param{int }{range}}

Sets the range (maximum value) of the gauge.

\wxheading{See also}

\helpref{wxGauge::GetRange}{wxgaugegetrange}

\membersection{wxGauge::SetShadowWidth}\label{wxgaugesetshadowwidth}

\func{void}{SetShadowWidth}{\param{int }{width}}

Sets the 3D shadow width.

\wxheading{Remarks}

Windows only, not for {\bf wxGA\_PROGRESSBAR}.

\membersection{wxGauge::SetValue}\label{wxgaugesetvalue}

\func{void}{SetValue}{\param{int }{pos}}

Sets the position of the gauge.

\wxheading{Parameters}

\docparam{pos}{Position for the gauge level.}

\wxheading{See also}

\helpref{wxGauge::GetValue}{wxgaugegetvalue}


</pre></body></html>