<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">%
% automatically generated by HelpGen from
% ../include/wx/strconv.h at 25/Mar/00 10:20:56
%

\section{\class{wxCSConv}}\label{wxcsconv}

This class converts between any character sets and Unicode.
It has one predefined instance, {\bf wxConvLocal}, for the
default user character set.

\wxheading{Derived from}

\helpref{wxMBConv}{wxmbconv}

\wxheading{Include files}

&lt;wx/strconv.h&gt;

\wxheading{See also}

\helpref{wxMBConv}{wxmbconv}, 
\helpref{wxEncodingConverter}{wxencodingconverter}, 
\helpref{wxMBConv classes overview}{mbconvclasses}

\latexignore{\rtfignore{\wxheading{Members}}}

\membersection{wxCSConv::wxCSConv}\label{wxcsconvwxcsconv}

\func{}{wxCSConv}{\param{const wxChar* }{charset}}

Constructor. Specify the name of the character set you want to convert
from/to.

\membersection{wxCSConv::\destruct{wxCSConv}}\label{wxcsconvdtor}

\func{}{\destruct{wxCSConv}}{\void}

Destructor.

\membersection{wxCSConv::LoadNow}\label{wxcsconvloadnow}

\func{void}{LoadNow}{\void}

If the conversion tables needs to be loaded from disk, this method
will do so. Otherwise, they will be loaded when any of the conversion
methods are called.

\membersection{wxCSConv::MB2WC}\label{wxcsconvmb2wc}

\constfunc{size\_t}{MB2WC}{\param{wchar\_t* }{buf}, \param{const char* }{psz}, \param{size\_t }{n}}

Converts from the selected character set to Unicode. Returns the size of the destination buffer.

\membersection{wxCSConv::WC2MB}\label{wxcsconvwc2mb}

\constfunc{size\_t}{WC2MB}{\param{char* }{buf}, \param{const wchar\_t* }{psz}, \param{size\_t }{n}}

Converts from Unicode to the selected character set. Returns the size of the destination buffer.

</pre></body></html>