%
% automatically generated by HelpGen $Revision$ from
% controlbar.h at 05/Jan/02 22:50:58
%


\section{\class{cbUpdateMgrData}}\label{cbupdatemgrdata}


structure, which is present in each item of layout,
   it used by any specific updates-manager to store
   auxilary information to be used by it's specific
   updating algorithm
 
\wxheading{Derived from}

\helpref{wxObject}{wxobject}

\wxheading{Data structures}

\latexignore{\rtfignore{\wxheading{Members}}}


\membersection{cbUpdateMgrData::cbUpdateMgrData}\label{cbupdatemgrdatacbupdatemgrdata}

\func{}{cbUpdateMgrData}{\void}

is-dirty flag is set TRUE initially


\membersection{cbUpdateMgrData::IsDirty}\label{cbupdatemgrdataisdirty}

\func{bool}{IsDirty}{\void}


\membersection{cbUpdateMgrData::SetCustomData}\label{cbupdatemgrdatasetcustomdata}

\func{void}{SetCustomData}{\param{wxObject* }{pCustomData}}


\membersection{cbUpdateMgrData::SetDirty}\label{cbupdatemgrdatasetdirty}

\func{void}{SetDirty}{\param{bool }{isDirty = TRUE}}


\membersection{cbUpdateMgrData::StoreItemState}\label{cbupdatemgrdatastoreitemstate}

\func{void}{StoreItemState}{\param{const wxRect\& }{boundsInParent}}

