\section{wxMGL port}\label{wxmglport}

wxMGL is a port of wxWindows using the MGL library available
from SciTech as the underlying graphics backend. wxMGL draws
its widgets using the wxUniversal widget set which is now
part of wxWindows. MGL itself runs on a variety of platforms
including DOS, Linux hardware (similar to the Linux framebuffer)
and various graphics systems such as Win32, X11 and OS/2.
Note that currently MGL for Linux runs only on x86-based systems.

You will need wxWindows 2.3.3 or higher and MGL 5.0 or higher.
The latter is available from

\urlref{http://www.scitechsoft.com/products/product_download.html}{http://www.scitechsoft.com/products/product_download.html}

In order to configure wxWindows to compile wxMGL you will 
need to type:

\begin{verbatim}
  configure --with-mgl --with-universal
\end{verbatim}
  
Under DOS, wxMGL uses a dmake based make system.

For further information, please see the files in docs/mgl
in the distribution.
