%
% automatically generated by HelpGen $Revision$ from
% toolwnd.h at 05/Jan/02 22:50:58
%


\section{\class{cbFloatedBarWindow}}\label{cbfloatedbarwindow}

\wxheading{Derived from}

\helpref{wxToolWindow}{wxtoolwindow}

\wxheading{Data structures}

\latexignore{\rtfignore{\wxheading{Members}}}


\membersection{cbFloatedBarWindow::cbFloatedBarWindow}\label{cbfloatedbarwindowcbfloatedbarwindow}

\func{}{cbFloatedBarWindow}{\void}


\membersection{cbFloatedBarWindow::GetBar}\label{cbfloatedbarwindowgetbar}

\func{cbBarInfo*}{GetBar}{\void}


\membersection{cbFloatedBarWindow::GetPreferredSize}\label{cbfloatedbarwindowgetpreferredsize}

\func{wxSize}{GetPreferredSize}{\param{const wxSize\& }{given}}

overriden methods of wxToolWindow


\membersection{cbFloatedBarWindow::HandleTitleClick}\label{cbfloatedbarwindowhandletitleclick}

\func{bool}{HandleTitleClick}{\param{wxMouseEvent\& }{event}}


\membersection{cbFloatedBarWindow::OnDblClick}\label{cbfloatedbarwindowondblclick}

\func{void}{OnDblClick}{\param{wxMouseEvent\& }{event}}


\membersection{cbFloatedBarWindow::OnMiniButtonClicked}\label{cbfloatedbarwindowonminibuttonclicked}

\func{void}{OnMiniButtonClicked}{\param{int }{btnIdx}}


\membersection{cbFloatedBarWindow::PositionFloatedWnd}\label{cbfloatedbarwindowpositionfloatedwnd}

\func{void}{PositionFloatedWnd}{\param{int }{scrX}, \param{int }{scrY}, \param{int }{width}, \param{int }{height}}

given coordinates are those of the bar itself
floated container window's position and size
are ajusted accordingly


\membersection{cbFloatedBarWindow::SetBar}\label{cbfloatedbarwindowsetbar}

\func{void}{SetBar}{\param{cbBarInfo* }{pBar}}


\membersection{cbFloatedBarWindow::SetLayout}\label{cbfloatedbarwindowsetlayout}

\func{void}{SetLayout}{\param{wxFrameLayout* }{pLayout}}

