%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%% Name:        progdlg.tex
%% Purpose:     wxProgressDialog documentation
%% Author:      wxWidgets Team
%% Modified by:
%% Created:     01.06.03
%% RCS-ID:      $Id$
%% Copyright:   (c) wxWidgets Team
%% License:     wxWindows license
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\section{\class{wxProgressDialog}}\label{wxprogressdialog}

This class represents a dialog that shows a short message and a
progress bar. Optionally, it can display ABORT and SKIP buttons,
the elapsed, remaining and estimated time for the end of the progress.


\wxheading{Derived from}

\helpref{wxDialog}{wxdialog}\\
\helpref{wxWindow}{wxwindow}\\
\helpref{wxEvtHandler}{wxevthandler}\\
\helpref{wxObject}{wxobject}

\wxheading{Include files}

<wx/progdlg.h>


\wxheading{Window styles}

\twocolwidtha{7cm}
\begin{twocollist}\itemsep=0pt
\twocolitem{\windowstyle{wxPD\_APP\_MODAL}}{Make the progress dialog modal. If this flag is
not given, it is only "locally" modal - that is the input to the parent
window is disabled, but not to the other ones.}
\twocolitem{\windowstyle{wxPD\_AUTO\_HIDE}}{Causes the progress dialog to disappear
from screen as soon as the maximum value of the progress meter has been
reached.}
\twocolitem{\windowstyle{wxPD\_SMOOTH}}{Causes smooth progress of the gauge control.}
\twocolitem{\windowstyle{wxPD\_CAN\_ABORT}}{This flag tells the dialog that it should have a
"Cancel" button which the user may press. If this happens, the next call to
\helpref{Update()}{wxprogressdialogupdate} will return false.}
\twocolitem{\windowstyle{wxPD\_CAN\_SKIP}}{This flag tells the dialog that it should have a
"Skip" button which the user may press. If this happens, the next call to
\helpref{Update()}{wxprogressdialogupdate} will return true in its skip parameter.}
\twocolitem{\windowstyle{wxPD\_ELAPSED\_TIME}}{This flag tells the dialog that it should show elapsed time (since creating the dialog).}
\twocolitem{\windowstyle{wxPD\_ESTIMATED\_TIME}}{This flag tells the dialog that it should show estimated time.}
\twocolitem{\windowstyle{wxPD\_REMAINING\_TIME}}{This flag tells the dialog that it should show remaining time.}
\end{twocollist}%


\latexignore{\rtfignore{\wxheading{Members}}}

\membersection{wxProgressDialog::wxProgressDialog}\label{wxprogressdialogctor}

\func{}{wxProgressDialog}{\param{const wxString\& }{title}, \param{const wxString\& }{message},\rtfsp
\param{int }{maximum = 100}, \param{wxWindow * }{parent = NULL},\rtfsp
\param{int }{style = wxPD\_AUTO\_HIDE | wxPD\_APP\_MODAL}}

Constructor. Creates the dialog, displays it and disables user input
for other windows, or, if wxPD\_APP\_MODAL flag is not given, for its parent
window only.

\wxheading{Parameters}

\docparam{title}{Dialog title to show in titlebar.}

\docparam{message}{Message displayed above the progress bar.}

\docparam{maximum}{Maximum value for the progress bar.}

\docparam{parent}{Parent window.}

\docparam{style}{The dialog style. See \helpref{wxProgressDialog}{wxprogressdialog}.}

\membersection{wxProgressDialog::\destruct{wxProgressDialog}}\label{wxprogressdialogdtor}

\func{}{\destruct{wxProgressDialog}}{\void}

Destructor. Deletes the dialog and enables all top level windows.

\membersection{wxProgressDialog::Resume}\label{wxprogressdialogresume}

\func{void}{Resume}{\void}

Can be used to continue with the dialog, after the user had chosen
ABORT.

\membersection{wxProgressDialog::Update}\label{wxprogressdialogupdate}

\func{virtual bool}{Update}{\param{int }{value}, \param{const wxString\& }{newmsg = ""},\rtfsp
\param{bool *}{skip = NULL}}

Updates the dialog, setting the progress bar to the new value and, if
given changes the message above it. Returns \true unless the Cancel button
has been pressed.

If \false is returned, the application can either immediately destroy the dialog
or ask the user for the confirmation and if the abort is not confirmed the
dialog may be resumed with \helpref{Resume}{wxprogressdialogresume} function.

\wxheading{Parameters}

\docparam{value}{The new value of the progress meter. It should be less than or
equal to the maximum value given to the constructor and the dialog is closed if
it is equal to the maximum.}
\docparam{newmsg}{The new messages for the progress dialog text, if it is
empty (which is the default) the message is not changed.}
\docparam{skip}{If "Skip" button was pressed since last
\helpref{Update}{wxprogressdialogupdate} call, this is set to true.}


\membersection{wxProgressDialog::Pulse}\label{wxprogressdialogpdatepulse}

\func{virtual bool}{Pulse}{\param{const wxString\& }{newmsg = ""},\rtfsp
\param{bool *}{skip = NULL}}

Just like \helpref{Update}{wxprogressdialogupdate} but makes
the gauge control run in indeterminate mode (see \helpref{wxGauge}{wxgauge} documentation),
sets the remaining and the estimated time labels (if present) to {\tt Unknown} and moves
the progress bar a bit to indicate that some progress was done.

