% -----------------------------------------------------------------------------
% wxBufferedInputStream
% -----------------------------------------------------------------------------
\section{\class{wxBufferedInputStream}}\label{wxbufferedinputstream}

This stream acts as a cache. It caches the bytes read from the specified
input stream (See \helpref{wxFilterInputStream}{wxfilterinputstream}).
It uses wxStreamBuffer and sets the default in-buffer size to 1024 bytes.

\wxheading{Derived from}

\helpref{wxFilterInputStream}{wxfilterinputstream}

\wxheading{Include files}

<wx/stream.h>

\wxheading{See also}

\helpref{wxStreamBuffer}{wxstreamBuffer}, \helpref{wxInputStream}{wxinputstream}

% -----------------------------------------------------------------------------
% wxBufferedOutputStream
% -----------------------------------------------------------------------------
\section{\class{wxBufferedOutputStream}}\label{wxbufferedoutputstream}

This stream acts as a cache. It caches the bytes to be written to the specified
output stream (See \helpref{wxFilterOutputStream}{wxfilteroutputstream}). The
datas are only written when the cache is full or when the buffered stream is
destroyed.

\wxheading{Derived from}

\helpref{wxFilterOutputStream}{wxfilteroutputstream}

\wxheading{Include files}

<wx/stream.h>

\wxheading{See also}

\helpref{wxStreamBuffer}{wxstreamBuffer}, \helpref{wxOutputStream}{wxoutputstream}

