X-Git-Url: https://git.saurik.com/cycript.git/blobdiff_plain/9f5848d94c08434a8c4c7851a0f41adc278a5484..ff6daad2927dc69d2b762c42f70381a5d1e4332f:/Bridge.def

diff --git a/Bridge.def b/Bridge.def
index 17b017a..3cf53b0 100644
--- a/Bridge.def
+++ b/Bridge.def
@@ -344,7 +344,7 @@ V UIKeyboardAnimationDurationUserInfoKey @
 
 F UIApplicationMain ii^^c@@
 
-F UIImageJPEGRepresentation @@
+F UIImageJPEGRepresentation @@f
 F UIImagePNGRepresentation @@
 F UIImageWriteToSavedPhotosAlbum v@@:^v
 
