X-Git-Url: https://git.saurik.com/cycript.git/blobdiff_plain/9f5848d94c08434a8c4c7851a0f41adc278a5484..d5fa31c512a3fefcc82ac3d757b25f59cd9c142a:/Bridge.def

diff --git a/Bridge.def b/Bridge.def
index 17b017a..111b5db 100644
--- a/Bridge.def
+++ b/Bridge.def
@@ -5,6 +5,8 @@ C NULL null
 : applicationDidFinishLaunching: v12@0:4@8
 
 T id @
+T Class #
+T SEL :
 
 T short s
 T int i
@@ -44,9 +46,9 @@ T UInt32 {uint32_t}
 T SInt64 {int64_t}
 T UInt64 {uint64_t}
 
-S CGPoint "x"f"y"f
+S CGPoint "x"{CGFloat}"y"{CGFloat}
 S CGRect "origin"{CGPoint}"size"{CGSize}
-S CGSize "width"f"height"f
+S CGSize "width"{CGFloat}"height"{CGFloat}
 
 l c
 
@@ -344,7 +346,7 @@ V UIKeyboardAnimationDurationUserInfoKey @
 
 F UIApplicationMain ii^^c@@
 
-F UIImageJPEGRepresentation @@
+F UIImageJPEGRepresentation @@f
 F UIImagePNGRepresentation @@
 F UIImageWriteToSavedPhotosAlbum v@@:^v
 
@@ -1241,7 +1243,7 @@ F CFShowStr v@
 
 f CoreGraphics
 
-T CGFloat f
+T CGFloat F
 
 # CGAffineTransform
 
