X-Git-Url: https://git.saurik.com/bison.git/blobdiff_plain/f805dfcb3fc6517dd0a49939fd6610999afcca00..f0f62c8c4d98bd4d10fb7164b82352d98fc32564:/lib/timevar.def?ds=sidebyside

diff --git a/lib/timevar.def b/lib/timevar.def
index 5caf7c3d..1143e998 100644
--- a/lib/timevar.def
+++ b/lib/timevar.def
@@ -1,6 +1,8 @@
 /* This file contains the definitions for timing variables used to -*- C -*-
    measure run-time performance of the compiler.
-   Copyright (C) 2002, 2007, 2009 Free Software Foundation, Inc.
+
+   Copyright (C) 2002, 2007, 2009-2012 Free Software Foundation, Inc.
+
    Contributed by Akim Demaille <akim@freefriends.org>.
 
    This file is part of Bison, the GNU Compiler Compiler.
