X-Git-Url: https://git.saurik.com/bison.git/blobdiff_plain/e141f4d4bb6584bfbf13003047a2e48e9a6eab6a..f2e1d4090df5b14fb7fdf33407df4f2bc7c5b342:/lib/timevar.def

diff --git a/lib/timevar.def b/lib/timevar.def
index ab04b226..484fe35f 100644
--- a/lib/timevar.def
+++ b/lib/timevar.def
@@ -1,6 +1,8 @@
 /* This file contains the definitions for timing variables used to -*- C -*-
    measure run-time performance of the compiler.
-   Copyright (C) 2002, 2007, 2009-2010 Free Software Foundation, Inc.
+
+   Copyright (C) 2002, 2007, 2009-2013 Free Software Foundation, Inc.
+
    Contributed by Akim Demaille <akim@freefriends.org>.
 
    This file is part of Bison, the GNU Compiler Compiler.
