<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">X-Git-Url: https://git.saurik.com/bison.git/blobdiff_plain/975bb564319aa4f4204c48aba265757ba207a80f..3209eb1c4c5de8dd812e65da27df00c548f476fe:/lib/timevar.def

diff --git a/lib/timevar.def b/lib/timevar.def
index 69f75eb8..4e135076 100644
--- a/lib/timevar.def
+++ b/lib/timevar.def
@@ -1,7 +1,7 @@
 /* This file contains the definitions for timing variables used to -*- C -*-
    measure run-time performance of the compiler.
 
-   Copyright (C) 2002, 2007, 2009-2014 Free Software Foundation, Inc.
+   Copyright (C) 2002, 2007, 2009-2015 Free Software Foundation, Inc.
 
    Contributed by Akim Demaille &lt;akim@freefriends.org&gt;.
 
</pre></body></html>