X-Git-Url: https://git.saurik.com/bison.git/blobdiff_plain/6e30ede87a1c39c53842a6a747ecd9f7484d92a5..465df9c65c7022a66e9cea7145b80886174e90af:/lib/timevar.def

diff --git a/lib/timevar.def b/lib/timevar.def
index 0ec927ef..1143e998 100644
--- a/lib/timevar.def
+++ b/lib/timevar.def
@@ -1,7 +1,7 @@
 /* This file contains the definitions for timing variables used to -*- C -*-
    measure run-time performance of the compiler.
 
-   Copyright (C) 2002, 2007, 2009, 2010 Free Software Foundation, Inc.
+   Copyright (C) 2002, 2007, 2009-2012 Free Software Foundation, Inc.
 
    Contributed by Akim Demaille <akim@freefriends.org>.
 
