X-Git-Url: https://git.saurik.com/bison.git/blobdiff_plain/575619af5e1f61a5f78fb3910bee424ead5fe5a6..ddb9db15:/lib/timevar.def

diff --git a/lib/timevar.def b/lib/timevar.def
index ad5e3568..484fe35f 100644
--- a/lib/timevar.def
+++ b/lib/timevar.def
@@ -1,7 +1,7 @@
 /* This file contains the definitions for timing variables used to -*- C -*-
    measure run-time performance of the compiler.
 
-   Copyright (C) 2002, 2007, 2009-2011 Free Software Foundation, Inc.
+   Copyright (C) 2002, 2007, 2009-2013 Free Software Foundation, Inc.
 
    Contributed by Akim Demaille <akim@freefriends.org>.
 
