X-Git-Url: https://git.saurik.com/bison.git/blobdiff_plain/46b8b6ce907cef2c0ac593dd156f95cd1689d951..68cae94e0b4e83246787fc5a413f085513ae9160:/lib/timevar.def

diff --git a/lib/timevar.def b/lib/timevar.def
index e02d013b..04ac392b 100644
--- a/lib/timevar.def
+++ b/lib/timevar.def
@@ -17,8 +17,8 @@
 
    You should have received a copy of the GNU General Public License
    along with Bison; see the file COPYING.  If not, write to
-   the Free Software Foundation, 59 Temple Place - Suite 330,
-   Boston, MA 02111-1307, USA.  */
+   the Free Software Foundation, 51 Franklin Street, Fifth Floor,
+   Boston, MA 02110-1301, USA.  */
 
 /* This file contains timing variable definitions, used by timevar.h
    and timevar.c.
