X-Git-Url: https://git.saurik.com/bison.git/blobdiff_plain/41d7a5f24d5e69bdf6ce10c012d50b89ce1e3957..2ad7e09e963e72ac4c69bb10b866b68947197aaf:/lib/timevar.def

diff --git a/lib/timevar.def b/lib/timevar.def
index 3a4128f2..b8a53c54 100644
--- a/lib/timevar.def
+++ b/lib/timevar.def
@@ -1,6 +1,6 @@
 /* This file contains the definitions for timing variables used to -*- C -*-
    measure run-time performance of the compiler.
-   Copyright (C) 2002, 2007 Free Software Foundation, Inc.
+   Copyright (C) 2002, 2007, 2009-2010 Free Software Foundation, Inc.
    Contributed by Akim Demaille <akim@freefriends.org>.
 
    This file is part of Bison, the GNU Compiler Compiler.
