X-Git-Url: https://git.saurik.com/bison.git/blobdiff_plain/1509d42fcb8fb8a78d46f0c26b863cafd347bee5..782a05f9de1bad15438e7e64f163269308cc0f06:/lib/timevar.def

diff --git a/lib/timevar.def b/lib/timevar.def
index a82666b3..e02d013b 100644
--- a/lib/timevar.def
+++ b/lib/timevar.def
@@ -1,22 +1,22 @@
 /* This file contains the definitions for timing variables used to -*- C -*-
    measure run-time performance of the compiler.
-   Copyright (C) 2000 Free Software Foundation, Inc.
-   Contributed by Alex Samuel <samuel@codesourcery.com>
+   Copyright (C) 2002 Free Software Foundation, Inc.
+   Contributed by Akim Demaille <akim@freefriends.org>.
 
-   This file is part of GCC.
+   This file is part of Bison, the GNU Compiler Compiler.
 
-   GCC is free software; you can redistribute it and/or modify
+   Bison is free software; you can redistribute it and/or modify
    it under the terms of the GNU General Public License as published by
    the Free Software Foundation; either version 2, or (at your option)
    any later version.
 
-   GCC is distributed in the hope that it will be useful,
+   Bison is distributed in the hope that it will be useful,
    but WITHOUT ANY WARRANTY; without even the implied warranty of
    MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
    GNU General Public License for more details.
 
    You should have received a copy of the GNU General Public License
-   along with GCC; see the file COPYING.  If not, write to
+   along with Bison; see the file COPYING.  If not, write to
    the Free Software Foundation, 59 Temple Place - Suite 330,
    Boston, MA 02111-1307, USA.  */
 
